An experiment was conducted to study the effect of tamoxifen on
patients with cervical cancer. One of the measurements made, both
before and again after tamoxifen was given, was microvessel density
(MVD). MVD, which is measured as number of vessels per mm$^2$, is a
measurement that relates to the formation of blood vessels that feed a
tumor and allow it to grow and spread.
