\documentclass[10pt,a4paper,landscape]{article}

\usepackage{pslatex}
\usepackage{graphics}

%%%%% page style %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage[left=5mm,right=5mm,top=10mm,bottom=10mm,headsep=0ex,headheight=0ex,footskip=0ex]{geometry}
\pagestyle{empty}

\newcommand{\rot}[1]{\rotatebox{90}{#1}\,\,}

\newcounter{studentnum}
\newcommand{\num}{\rule{0pt}{7.0ex}{\stepcounter{studentnum}\small \arabic{studentnum}}}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{document}

\sffamily
\section*{Scientific computing WS\,20/21: Project score sheet}

\noindent
\begin{tabular}{|p{0.15\textwidth}|p{0.10\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.019\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.018\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.024\textwidth}|p{0.024\textwidth}|p{0.02\textwidth}|l|l|}
\hline
Name & Project & \multicolumn{3}{l|}{Project} & \multicolumn{3}{l|}{Figures$^1$} & \multicolumn{3}{l|}{Code} & \multicolumn{7}{l|}{Codestyle (7P)$^2$} & \multicolumn{2}{l|}{Documentation} & Sum & Grade \rule{0.pt}{3ex} \\ 
  & & \rot{Completed} & \rot{Presentation}\rot{Structure, didactics} & \rot{Bonus:}\rot{Context \& own ideas} & \rot{Readability}\rot{font size, etc.} & \rot{Labels, units, and}\rot{statistical measures} & \rot{Consitent design, size,}\rot{layout, color code} & \rot{Runs} & \rot{Figures saved} & \rot{Bonus:}\rot{Interesting code} & \rot{Inconsitent naming}\rot{of files \& functions} & \rot{Inconsistent naming}\rot{of variables} & \rot{Inconsistent use of}\rot{whitespace/empty lines} & \rot{Spaghetti code} & \rot{Non-modularized}\rot{code}& \rot{Mixed function}\rot{purpose}& \rot{Functions are not}\rot{standalone} & \rot{Main script} & \rot{Functions: purpose, }\rot{argument type \& shape,}\rot{function usage}  & & \\ 
  & & 0--4 & 0--4 & 0--2 & 0--2 & 0--3 & 0--3 & 0--2 & 0, 1 & 0--2 & -1 & -1 & -1 & -1 & -1 & -1 & -1 & 0--1 & 0--3  & 30 & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
\end{tabular}
$^1$ see chapter 3: \emph{Graphical representation of scientific data}; $^2$ see chapter 4: \emph{Code style} for more information


\noindent
\begin{tabular}{|p{0.15\textwidth}|p{0.10\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.019\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.018\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.02\textwidth}|p{0.024\textwidth}|p{0.024\textwidth}|p{0.02\textwidth}|l|l|}
\hline
Name & Project & \multicolumn{3}{l|}{Project} & \multicolumn{3}{l|}{Figures$^1$} & \multicolumn{3}{l|}{Code} & \multicolumn{7}{l|}{Codestyle (7P)$^2$} & \multicolumn{2}{l|}{Documentation} & Sum & Grade \rule{0.pt}{3ex} \\ 
  & & \rot{Completed} & \rot{Presentation}\rot{Structure, didactics} & \rot{Bonus:}\rot{Context \& own ideas} & \rot{Readability}\rot{font size, etc.} & \rot{Labels, units, and}\rot{statistical measures} & \rot{Consitent design, size,}\rot{layout, color code} & \rot{Runs} & \rot{Figures saved} & \rot{Bonus:}\rot{Interesting code} & \rot{Inconsitent naming}\rot{of files \& functions} & \rot{Inconsistent naming}\rot{of variables} & \rot{Inconsistent use of}\rot{whitespace/empty lines} & \rot{Spaghetti code} & \rot{Non-modularized}\rot{code}& \rot{Mixed function}\rot{purpose}& \rot{Functions are not}\rot{standalone} & \rot{Main script} & \rot{Functions: purpose, }\rot{argument type \& shape,}\rot{function usage}  & & \\ 
  & & 0--4 & 0--4 & 0--2 & 0--2 & 0--3 & 0--3 & 0--2 & 0, 1 & 0--2 & -1 & -1 & -1 & -1 & -1 & -1 & -1 & 0--1 & 0--3  & 30 & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
 \num & & & & & & & & & & & & & & & & & & & & & \\ \hline
\end{tabular}
$^1$ see chapter 3: \emph{Graphical representation of scientific data}; $^2$ see chapter 4: \emph{Code style} for more information
\end{document}
