<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">For each of 31 healthy dogs, a veterinarian measured the glucose
concentration in the anterior chamber of the right eye and also in the
blood serum. The following data are the anterior chamber glucose
measurements, expressed as a percentage of the blood glucose.
</pre></body></html>