\begin{table}[ht!]
    
    \centering
    \linespread{1.5}\selectfont
    \fontsize{10pt}{12pt}\selectfont{
    \begin{tabular}{c c c c c c }
    \Xhline{1\arrayrulewidth}
            		& Gating                                & \(V_{1/2}\) [mV]& \(k\)         & \(j\)         & \(a\)   \\
            		\Xhline{1\arrayrulewidth}
    %Pospischil
            		&   \(\textrm{I}_{\textrm{Na}}\) activation                         &-34.33054521   & -8.21450277   & 1.42295686    &  ---     \\
RS pyramidal,		        & \(\textrm{I}_{\textrm{Na}}\) inactivation                       &-34.51951036   & 4.04059373    & 1             & 0.05  \\
  RS inhibitory,	& \(\textrm{I}_{\textrm{Kd}}\) activation                       &-63.76096946   & -13.83488194  & 7.35347425    &  ---     \\
 FS        & \(\textrm{I}_{\textrm{L}}\) activation            &-39.03684525   & -5.57756176   & 2.25190197    & ---       \\
    	  	& \(\textrm{I}_{\textrm{L}}\) inactivation                 &-57.37         & 20.98         & 1             & ---      \\
            		& \(\textrm{I}_{\textrm{M}}\) activation                          &-45            & -9.9998807337 & 1             &   ---    \\         %-45 with 10 mV shift to contributes to resting potential
            		&						&			&			& &\\
  \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \)        		& \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \)  activation                      &-30.01851852   &  -7.73333333  & 1             & ---      \\ 
         		& \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \) Inactivation                    &-46.85851852   & 7.67266667    & 1             & 0.245 \\
         		\Xhline{1\arrayrulewidth} 
    

    \end{tabular}}
      \caption[Gating Properties]{ For comparability to typical electrophysiological data fitting reported and for ease of further gating curve manipulations, a sigmoid function (eqn.\ref{eqn:Boltz}) %Boltzmann \(x_\infty = {\left(\frac{1-a}{1+{exp[{\frac{V-V_{1/2}}{k}}]}} +a\right)^j}\) 
       with slope \(k\), voltage for half-maximal activation or inactivation (\(V_{1/2}\)), exponent \(j\), and persistent current \(0 \leq a \leq 1\) were fitted for the \citet{pospischil_minimal_2008} models where \(\alpha_x\) and \(\beta_x\) are used. Gating parameters for  \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \) are taken from \citet{ranjan_kinetic_2019} and fit to mean wild type parameters in \citet{lauxmann_therapeutic_2021}. Model gating not listed are taken directly from source publication.}
    \label{tab:gating}
\end{table}