\begin{table}[ht!]
    \caption[Gating Properties]{ For comparability to typical electrophysiological data fitting reported and for ease of further gating curve manipulations, a sigmoid function (Eqn.\ref{eqn:Boltz}) %Boltzmann \(x_\infty = {\left(\frac{1-a}{1+{exp[{\frac{V-V_{1/2}}{k}}]}} +a\right)^j}\) 
       with slope \(k\), voltage for half-maximal activation or inactivation (\(V_{1/2}\)), exponent \(j\), and persistent current \(0 \leq a \leq 1\) were fitted for the models originating from \citet{pospischil_minimal_2008} (models B, C, D, E, G, H) where \(\alpha_x\) and \(\beta_x\) are used. Gating parameters for  \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \) are taken from \citet{ranjan_kinetic_2019} and fit to mean wild type parameters in \citet{lauxmann_therapeutic_2021}. Model gating parameters not listed are taken directly from source publication.}
    \centering
    \linespread{1.5}\selectfont
    \fontsize{10pt}{12pt}\selectfont{
    \begin{tabular}{c c c c c c }
    \Xhline{1\arrayrulewidth}
            		& Gating                                & \(V_{1/2}\) [mV]& \(k\)         & \(j\)         & \(a\)   \\
            		\Xhline{1\arrayrulewidth}
    %Pospischil
   &   \(\textrm{I}_{\textrm{Na}}\) activation                         &\(-34.33054521\)   & \(-8.21450277\)   & \(1.42295686\)    &  ---     \\
             & \(\textrm{I}_{\textrm{Na}}\) inactivation                       &\(-34.51951036\)   & \(4.04059373\)    & \(1\)             & \(0.05\)  \\
 Models     & \(\textrm{I}_{\textrm{Kd}}\) activation                       &\(-63.76096946\)   & \(-13.83488194\)  & \(7.35347425\)    &  ---     \\
   B, C, D, E, G, H 	& \(\textrm{I}_{\textrm{L}}\) activation            &\(-39.03684525\)   & \(-5.57756176\)   & \(2.25190197\)    & ---       \\
 	& \(\textrm{I}_{\textrm{L}}\) inactivation                 &\(-57.37\)        & \(20.98\)         & \(1\)             & ---      \\
	 & \(\textrm{I}_{\textrm{M}}\) activation                          &\(-45\)            & \(-9.9998807337\) & \(1\)            &   ---    \\         %-45 with 10 mV shift to contributes to resting potential
%            		&						&			&			& &\\
\Xhline{1\arrayrulewidth}
  \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \)        		& \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \)  activation                      &\(-30.01851852\)   &  \(-7.73333333\)  & \(1\)             & ---      \\ 
         		& \(\textrm{I}_{\textrm{K}_{\textrm{V}}\textrm{1.1}}\ \) Inactivation                    &\(-46.85851852\)   & \(7.67266667\)    & \(1\)             & \(0.245\) \\
         		\Xhline{1\arrayrulewidth} 
    

    \end{tabular}}
      
    \label{tab:gating}
\end{table}