\documentclass[11pt]{article}

\usepackage[utf8]{inputenc}
\usepackage{textcomp}
\usepackage{xcolor}
\usepackage{graphicx}

\usepackage[ngerman,english]{babel}

\usepackage[left=25mm, right=25mm, top=20mm, bottom=20mm]{geometry}
\setlength{\parskip}{2ex}

\usepackage[mediumqspace,Gray,squaren]{SIunits}      % \ohm, \micro

\usepackage{natbib}
%\bibliographystyle{jneurosci}

\usepackage[breaklinks=true,bookmarks=true,bookmarksopen=true,pdfpagemode=UseNone,pdfstartview=FitH,colorlinks=true,citecolor=blue,urlcolor=blue]{hyperref}

\newcommand{\issue}[1]{\textbf{#1}}
\newcommand{\issueg}[1]{\foreignlanguage{ngerman}{\textbf{#1}}}
\newcounter{responsecounter}
\newcommand{\response}[1]{\refstepcounter{responsecounter}\begin{quote}\arabic{responsecounter}. #1\end{quote}}
\newcommand{\note}[2][]{\textcolor{red!80!black}{\textbf{[#1: #2]}}}
\newcommand{\notejb}[1]{\note[JB]{#1}}
\newcommand{\notejg}[1]{\note[JG]{#1}}
\newcommand{\notesr}[1]{\note[SR]{#1}}

\newcommand{\changed}[1]{\textcolor{blue!50!black}{#1}}

\setlength{\parindent}{0em}


\begin{document}

Thank you for your final positive assessment of our manuscript.

\issue{\large Reviewer \#1}

\issue{Line 18 In the abstract the sentence "...only in individual low-noise P-units, but in more than half of the ampullary cells". is not quite clear. Please rephrase.}

\issue{\large Reviewer \#2}

\issue{The authors have done an excellent job of responding to my comments. I will note that the line numbers referenced in the response letter are incorrect, which made it challenging to review these changes. However, I have just one remaining minor comment. In the abstract, line 18, the wording is still unclear. "...more than half of the ampullary cells" is clear, but "...only in individual low-noise P-units" is not. Why not precisely state that these predicted nonlinear responses were observed in X out of Y P-units?}

\response{We have rephrased this sentence as requested: ``In our
  combined experimental and modeling approach we identify these
  predicted nonlinear responses in those 31 out of 172 P-units that
  are characterized by low intrinsic noise. In contrast, the majority
  (22 out of 30) ampullary cells show nonlinear responses.''}

\end{document}
